Generation

Penalty coefficient value (Logarithmic scale)

0 1000 2000 3000 4000 5000

-40 10

-30 10

-20 10

-10 10

010 C1 penalty coeff C2 penalty coeff C3 penalty coeff C4 penalty coeff C5 penalty coeff C6 penalty coeff

Evolution of the penalty coeffs correspending to the 6 constraints of G4